Lightcurves of a Variable Source

Time (s)

6.9585 ´ 10^7

6.9590 ´ 10^7

6.9595 ´ 10^7

6.9600 ´ 10^7

6.9605 ´ 10^7

6.9610 ´ 10^7

6.9615 ´ 10^7

Count Rate (s^{-1})

0

0.02

0.04

0.06

0.08

0.1

Curve 1 Curve 2