RA, Dec, and roll variation

-0.002 0 0.002

-0.003

-0.002

-0.001 0 0.001

0.002

0.003

D t (ks)

10 12 14 16 18 20

-0.008

-0.007

-0.006

-0.005

D a [°] D d [°] D roll [°]