RX J0318.2-0301

TIME (s)

1.4597 ´ 10^8 1.4598 ´ 10^8 1.4599 ´ 10^8

COUNT_RATE (count/s)

0

50

100

150

200

250

300

1.4597 ´ 10^8 1.4598 ´ 10^8

2

4

6

8