CHANDRA Calibration Workshop

November 6-7, 2002

• 84 attendees; significant attendance by “external groups” • 50 presentations (40 oral, 10 poster) • Proceedings available on-line http://cxc.harvard.edu/ccw/proceedings/index.html • Feedback (solicited and volunteered) has been uniformly favorable • Calibration group would like to continue and extend this format for the communication of all calibration issues to any interested parties • Planning has started for 2003