Sixth HEAD Meeting April 22, 2002

ACIS CALIBRATION IN PROGRESS OR UNDER INVESTIGATION

I Evaluation of the S3 response around the Si-K and Ir edges II Evaluation of the low-energy gain in the BI CCDs III Assessment of the current uncertainties in the low-energy QE IV Evaluation of new matrix under development for S3 @ -110 C data

Paul Plucinsky (CXC) ACIS Data Analysis and Calibration Session