Sixth HEAD Meeting April 22, 2002

FIT RESULTS FOR G21.5

Table 1:

Fit Description Reduced χ^2 Fitted N_H (×10^{22}cm^{−2}) Fitted Index & 90% CL & 90% CL PHA, current matrix 1.05 2.25 [2.17, 2.33] 1.67 [1.61, 1.73] PHA, prototype matrix 1.02 2.38 [2.30, 2.47] 1.71 [1.65, 1.77] PI, current matrix 0.98 2.31 [2.23, 2.39] 1.68 [1.62, 1.75] PI, prototype matrix 0.94 2.36 [2.28, 2.45] 1.70 [1.64, 1.76]

Paul Plucinsky (CXC) ACIS Data Analysis and Calibration Session