\documentclass[11pt]{article}

\usepackage{lscape}

\topmargin -0.75truein
\oddsidemargin -0.6truein
\textheight 9.75truein
\textwidth 7.0truein
\hbadness=10001
\hfuzz=200pt

\thispagestyle{empty}

\begin{document}

\begin{landscape}

\begin{table}[tbp]
\centering
\caption[ ]{\bf SOT Flight Procedure Release May \& June, 1999}

\begin{tabular}{|l|l|l|l|c|l|l|l|}
\hline
\#  & Title		& Filename & Date Rev & Chng & new \# & New Filename & New Title  \\
\hline
\hline
1.1\_1.2 & Open Little Vent Valve & open\_svv & May 6 & Y & 1.1\_1.5 &
    & Open Small Vent Valve \\
\hline
1.2\_V1.1 & Monitor Pressures and Temps & monitor\_tp & May 6 &  &  &
DELETED & DELETED \\
NEW    & &   &  & Y  & 1.22\_V1.0 & xdcr\_ab\_on & Turn On Press.
XDCRs A \& B \\
\hline
NEW     & &   &  & Y  & 4.20\_V1.0 & xdcr\_ab\_off & Turn Off Press.
XDCRs A \& B \\
\hline
1.3\_V1.3 & Turn on DPA A \& B and DEA A & dpaab\_deaa\_on & May 6
& Y & 1.3\_V1.5 & &  \\
\hline
1.4\_V1.2 & Load DEA HK PB and  & dea\_hkp  & May 6 & Y & 1.4\_V1.4 & & \\
\hline
1.5\_V1.1 & Turn on the DA Heater Side B & dahtr\_b\_on & May 6 & Y &
1.5\_V1.2 &  & \\
\hline
1.6\_V1.2 & Set FP Temperature to -120~C & setfp\_m120 & May 6 & Y & 1.6\_V1.3
& & \\
\hline
1.7\_V1.2 & Open Large Vent Valve & open\_bvv & May 6 & Y & 1.7\_V1.5
&  & Open Big Vent Valve \\
\hline
1.8\_V1.2 & Partial Bakeout, Set FP to -50~C  & bakeout\_m50 & May 18 &
Y & 1.8\_V1.4 &  &  \\
\hline
1.9\_V1.2 & Set FP Temperature to -90 C & setfp\_m90  & May 18 & Y &
1.9\_V1.4 & & \\
\hline
1.10\_V1.2 & Dump Flight SW & sw\_dump & May 18 & N & & & \\
\hline
1.11\_V1.1 & Flight SW Standard Patches  & sw\_stdpatch & 
& Y & 1.11\_V1.2 & & \\
\hline
1.12\_V1.1 & Flight SW Event Histogram  & sw\_evhcc3x3  & & & & & \\
           & and CC 3x3 Patch & & & Y & 1.12\_V1.3 & &  \\
\hline
1.13\_V1.2 & Diagnostic Mode & diag\_scs & May 18 & Y & 1.13\_V1.5 &  & \\
\hline
1.14\_V1.2 & Raw Data from each CCD & raw\_data & May 18 & Y & 1.14\_V1.3 &  & \\
\hline
1.15\_V1.2 & OBF Integrity Test & obf\_intg & May 20 & Y & 1.15\_V1.3 &  & \\
\hline
1.16\_V1.2 & Dark Current Meas. & dark\_cur & May 20 & Y & 1.16\_V1.3 &  & \\
\hline
1.17\_V1.2 & Int Cal Source Meas. at -90~C &
intcal\_m90 & May 20 &  &  & DELETED  & DELETED \\
NEW  &  &  & & Y  & 1.23\_V1.0  & intcal & Int Cal Source Meaurement \\
\hline
1.18\_V1.2 & Int Cal Source Meas. at -110~C &
intcal\_m110 & May 20 &  &  & DELETED  & DELETED \\
\hline
1.19\_V1.2 & Int Cal Source Meas. at -120~C &
intcal\_m120 & May 20 &  &  & DELETED  & DELETED \\
\hline
1.20\_V1.2 & Flight SW: Event Histogram patch & sw\_evhpatch & May 20 &  &  & DELETED  & DELETED \\
\hline
1.21\_V1.2 & Evt Hist on the Int Cal Source  & evhist\_sarray & May 20
& Y & 1.21\_V1.3 & & \\
           & with ACIS-S in fmt 1 & & & & & &   \\
\hline
NEW & & & &  & 1.24\_V1.0 & evhist\_iarray & Evt Hist on the Int Cal Source  \\
           & & & & & & & with ACIS-I in fmt 1    \\
\hline
2.2\_V1.1 & Exercise FP Heater Controls & heater\_fp & May 27 & & &
DELETED & DELETED \\ 
\hline
2.3\_V1.2 & SW Boot Modes: Uplink Boot & uplink\_boot & May 27 & Y & 2.3\_V1.4  & 
&  \\ 
\hline
2.4\_V1.2 & SW Boot Modes: Warm and Cold & swbootmode & May 27 & Y & 2.4\_V1.3 & & \\ 
\hline
2.5\_V1.2 & BEP/DEA Power Combinations & power\_combo & May 27 & Y & 2.5\_V1.3 & & \\ 
\hline
2.6\_V1.2 & DEA/FEP MUX Verification & deafep\_mux & May 27 & Y & 2.6\_V1.3 & & \\ 
\hline
2.7\_V1.1 & DEA Video Board DAC Limit Test & dac\_limits & May 27 & & & DELETED & DELETED \\ 
\hline
\end{tabular}

\end{table}

\end{landscape}

\begin{landscape}


\begin{table}[tbp]
\centering
\caption[ ]{\bf Page 2: SOT Flight Procedure Release May, 1999}

\begin{tabular}{|l|l|l|l|c|l|l|l|}
\hline
\#  & Title		& Filename & Date Rev & Chng & new \# & New Filename & New Title  \\
\hline
\hline
2.8\_V1.2  & CCD Orbital Background Meas.  &
bkg\_doorcl & May 27 & & & DELETED & DELETED \\ 
           & with the ACIS Door Closed & & & & & &  \\ 
\hline
2.9\_V1.2 & Full Bakeout & full\_bakeout & May 27 & Y & 2.9\_V1.3  & & \\ 
NEW       &              &               &        &   & 2.13\_V1.0 &
full\_bkout\_off & Exit Full Bakeout and Return \\
 & & & & & & &      to Thermal Standby Mode \\
\hline
2.10\_V1.2 & Open ACIS Door On Orbit  & open\_door & June 1  & Y
& 2.10\_V1.4  & & \\ 
\hline
2.11\_V1.2 & CCD Orbital Background Meas. & bkg\_doorop & May 27
& Y & 2.11\_V1.4  & & \\ 
           & with the ACIS Door Open & & & & & &  \\ 
\hline
2.12\_V1.2  & HRMA Flux Standard Transfer  &
hrma\_fcm & May 27 & Y & 2.12\_V1.3  & & \\ 
  & Sources Measurement &  & &  &  & & \\ 
\hline
3.2\_V1.2  & Emergency Load Shed Procedure & SILSSCS & May 27 & Y & 3.2\_V1.3  & & \\ 
\hline
3.4\_V1.2  & Autonomous Power-Up Procedure & SIPUSCS & May 27 & Y & 3.4\_V1.3  & & \\ 
 \hline
4.2\_V1.2  & Turn on DPA A \& B and DEA A  &
dpaab\_deaa\_scs & May 27 & Y & 4.2\_V1.3 & & \\ 
  & [SCS version] &  & &  &  & & \\ 
\hline
4.3\_V1.2  & Turn on DPA A  & dpaa\_on & May 27 & Y & 4.3\_V1.3 & & \\ 
\hline
4.4\_V1.2  & Turn on DPA B  & dpab\_on & May 27 & Y & 4.4\_V1.3 & & \\ 
\hline
4.5\_V1.2  & Turn on DEA A  & deaa\_on & May 27 & Y & 4.5\_V1.3 & & \\ 
\hline
4.6\_V1.2  & Turn off DPA A & dpaa\_off & May 27 & Y & 4.6\_V1.3  & & \\ 
\hline
4.7\_V1.2  & Turn off DPA B & dpab\_off & May 27 & Y & 4.7\_V1.3  & & \\ 
\hline
4.8\_V1.2  & Turn off DEA A & deaa\_off & May 27 & Y & 4.8\_V1.3 & & \\ 
\hline
4.9\_V1.2 & Turn Off DPA A \& B and DEA A & dpaab\_deaa\_off & May 27
& Y & 4.9\_V1.3 & & \\ 
\hline
4.10\_V1.1 & Put ACIS into Memory Save Mode & mem\_save & June 1 & Y &
4.10\_V1.2 & & \\ 
\hline
4.11\_V1.1 & Put ACIS into Standby Mode   & standby & June 1 & Y & 4.11\_V1.2 & & \\ 
\hline
4.15\_V1.2 & Set focal plane temperature to -50 C & setfp\_m50 & June
1  &  & & DELETED  & DELETED \\ 
\hline
4.17\_V1.1 & Warm Boot the ACIS BEP & warmboot & June 1 & Y &
4.17\_V1.2  & & \\ 
\hline
4.18\_V1.1 & Cold Boot the ACIS BEP & coldboot & June 1 & Y &
4.18\_V1.2  & & \\ 
\hline
4.19\_V1.1 & Radiation Belt Entry  & radbelt\_entry & June 1 & Y & 4.19\_V1.2 & & \\ 
\hline
NEW     & &   &  & Y  & 4.21\_V1.0 & setfp\_m110 & Set FP Temperature
to -110~C  \\
\hline
\end{tabular}

\end{table}

\end{landscape}

\begin{landscape}


\begin{table}[tbp]
\centering
\caption[ ]{\bf Page 2: SOT Flight Procedure Release May, 1999}

\begin{tabular}{|l|l|l|l|c|l|l|l|}
\hline
\#  & Title		& Filename & Date Rev & Chng & new \# & New Filename & New Title  \\
\hline
\hline
5.1\_V1.2 & Close Little Vent Valve & close\_svv & June 1 & Y &
5.1\_V1.3 & & \\ 
\hline
5.3\_V1.3 & Close Large Vent Valve & close\_bvv & June 1 & Y & 5.3\_V1.4 & & \\ 
\hline
5.5\_V1.2 & Open Little Vent Valve in an  &
open\_svv\_emgdep & June 1 & Y & 5.5\_V1.3  & & Open Small Vent Valve\\ 
           & Emergency Deployment  & & & & & & in an Emergency Deployment \\ 
\hline
5.6\_V1.1 & Turn Off DA heater side B  &
dahtr\_aon\_boff & June 1 & Y & 5.6\_V1.2 & & \\ 
           & and turn on side A  & & & & & &  \\ 
\hline
5.7\_V1.1 & Turn Off DA heater side A  &
dahtr\_bon\_aoff & June 1 & Y & 5.7\_V1.2  & & \\ 
           & and turn on side B  & & & & & &  \\ 
\hline
5.8\_V1.2 & Switch from BEP A to BEP B & switch\_bepa\_b & June 1 & Y
& 5.8\_V1.3 & & \\ 
\hline
5.9\_V1.1 & Switch from DEA A to DEA B & switch\_deaa\_b & June 1 & Y
& 5.9\_V1.2 & & \\ 
\hline
\end{tabular}

\end{table}

\end{landscape}


\end{document}

