Table 1: Renaming of ACIS SOT Procedure Filenames April 21, 1999 Old # Title Old Filenames New # New Filenames 1.1 V1.1 Open Little Vent Valve open lvv 1.1 V1.2 open svv 1.2 V1.1 Monitor Pressures and Temps monitor tp No change same during Orbital Insertion 1.3 V1.1 Turn on DPA A & B and DEA A turnon dpaab deaa 1.3 V1.3 dpaab deaa on 1.4 V1.1 Load DEA HK PB and deahkp 1.4 V1.2 dea hkp Start DEA HK Run 1.5 V1.1 Turn on the DA Heater Side B dahtr b on no change same 1.6 V1.1 Set FP Temperature to -120 C setFP m120 1.6 V1.2,name change setfp m120 1.7 V1.1 Open Large Vent Valve open vv 1.7 V1.2 open bvv 1.9 V1.1 Set FP Temperature to -90 C setFP m90 1.9 V1.2,name change setfp m90 1.10 V1.1 Dump Flight SW fs dump 1.10 V1.2 sw dump 1.13 V1.1 Diagnostic Mode ccd diag posttv 1.13 V1.2 diag scs 1.14 V1.1 Raw Data from each CCD ccd raw 1.14 V1.2,name change raw data 1.20 V1.1 Flight SW: Event Histogram patch sw evhpatch 1.20 V1.2 same 1.21 V1.1 Evt Hist on the Int Cal Source ccd evhist s 1.21 V1.2 evhist sarray with ACIS-S in fmt 1 2.3 V1.1 SW Boot Modes: Uplink Boot uplink boot 2.3 V1.2 same 2.4 V1.1 SW Boot Modes: Warm and Cold swbootmode 2.4 V1.2 same 2.5 V1.1 BEP/DEA Power Combinations power combo 2.5 V1.2 same 2.6 V1.1 DEA/FEP MUX Verification deafep mux 2.6 V1.2 same 2.9 V1.1 Full Bakeout full bakeout cold 2.9 V1.2,name change full bakeout 4.9 V1.1 Turn Off DPA A & B and DEA A turnoff dpaab deaa 4.9 V1.2 dpaab deaa off 4.10 V1.1 Put ACIS into Memory Save Mode mem save No change same 4.11 V1.1 Put ACIS into Standby Mode standby No change same

Table 2: Renaming of ACIS SOT Procedure Filenames April 24, 1999 Old # Title Old Filenames New # New Filenames 4.19 V1.1 Radiation Belt Entry radbelt entry no change same 1.8 V1.1 Partial Bakeout, set FP to -50 C bakeout m50C 1.8 V1.2,name change bakeout m50 1.11 V1.1 Flight Software Standard Set of Patches (realtime) sw stdpatch not reviewed same 1.12 V1.1 Flight Software Event Histogram and CC 3x3 Patch sw optevhcc3x3 1.12 V1.2,name change sw evhcc3x3 1.15 V1.1 OBF Integrity Test ccd obf 1.15 V1.2,name change obf intg 1.16 V1.1 Dark Current Measurement ccd dark 1.16 V1.2,name change dark cur 1.17 V1.1 Internal Calibration Source Measurement at -90 C ccd int1 1.17 V1.2,name change intcal m90 1.18 V1.1 Internal Calibration Source Measurement at -110 C ccd int2 1.18 V1.2,name change intcal m110 1.19 V1.1 Internal Calibration Source Measurement at -120 C ccd int3 1.19 V1.2,name change intcal m120 2.2 V1.1 Exercise Focal Plane Heater Controls heater fp not reviewed same 2.7 V1.1 DEA Video Board DAC Limit Test dac limits not reviewed same 2.8 V1.1 CCD Orbital Background Measurements ccd orbbkg1 2.8 V1.2,name change bkg doorcl 2.11 V1.1 CCD Orbital Background Measurements II ccd orbbkg2 2.11 V1.2,name change bkg doorop 2.12 V1.1 HRMA Flux Standard Transfer Sources Measurements ccd fcm 2.12 V1.2,name change hrma fcm 4.2 V1.1 Turn on DPA A & B and DEA A [SCS version] turnon dpaab deaa scs 4.2 V1.2 dpaab deaa scs 4.3 V1.1 Turn on DPA A turnon dpaa 4.3 V1.2 dpaa on 4.4 V1.1 Turn on DPA B turnon dpab 4.4 V1.2 dpab on 4.5 V1.1 Turn on DEA A turnon deaa 4.5 V1.2 deaa on 4.6 V1.1 Turn off DPA A turnoff dpaa 4.6 V1.2 dpaa off 4.7 V1.1 Turn off DPA B turnoff dpab 4.7 V1.2 dpab off 4.8 V1.1 Turn off DEA A turnoff deaa 4.8 V1.2 deaa off 4.15 V1.1 Set focal plane temperature to -50 C setFP m50 4.15 V1.2,name change setfp m50 4.17 V1.1 Warm Boot the ACIS BEP warmboot no change same 4.18 V1.1 Cold Boot the ACIS BEP coldboot no change same 5.1 V1.1 Close Little Vent Valve close lvv 5.1 V1.2,name change close svv 5.2 V1.1 Abort Opening Large Vent Valve abort opvv DELETED 5.3 V1.1 Close Large Vent Valve close vv 5.3 V1.3 close bvv 5.4 V1.1 Abort Closing Large Vent Valve abort clvv DELETED 5.5 V1.1 Open Little Vent Valve in Emergency Deployment open lvv emgdep 5.5 1.2,name change open svv emgdp [SCS version] 5.6 V1.1 Turn Off DA heater side B and turn on side A dahtr aon boff no change same 5.7 V1.1 Turn Off DA heater side A and turn on side B dahtr bon aoff no change same 5.8 V1.1 Switch from BEP A to BEP B switch bepa b 5.8 V1.2 same 5.9 V1.1 Switch from DEA A to DEA B switch deaa b not reviewed same