\documentclass[11pt]{article}

\usepackage{lscape}

\topmargin -1.0truein
\oddsidemargin -0.5truein
\textheight 9.75truein
\textwidth 7.0truein
\hbadness=10001
\hfuzz=200pt


\begin{document}
%\input dspace12.tex
%\input pstricks.tex
%\input psfig
\newcommand{\be}{\begin{enumerate}}
\newcommand{\ee}{\end{enumerate}}
\newcommand{\bc}{\begin{center}}
\newcommand{\ec}{\end{center}}
\newcommand{\bi}{\begin{itemize}}
\newcommand{\ei}{\end{itemize}}
\newcommand{\bd}{\begin{description}}
\newcommand{\ed}{\end{description}}
\newcommand{\bt}{\begin{tabbing}}
\newcommand{\et}{\end{tabbing}}
\newcommand{\eg}{{\it e.g.~}}
\newcommand{\ie}{{\it i.e.~}}
\newcommand{\ul}{\underline}
\newcommand{\axaf}{{\em AXAF}}
\def\la{\hbox{\rlap{$<$}\lower0.5ex\hbox{$\sim$}\ }}


\large
%\vspace*{-0.5in}
\centerline {\bf 5.10\_V1.1 PARTIAL BAKEOUT, SET FP TO +20~C }
\vspace{0.25in}

\normalsize
\noindent{\it Last Revised: July 16,1999}\\
\noindent{\bf Filename: bakeout\_p20} \\

\noindent {\bf BRIEF FUNCTIONAL DESCRIPTION:} \\
\normalsize
This is a contigency procedure which regulates the focal plane temperature
to +20~C. {\bf THE INSTRUMENT IS LEFT IN A STATE WITH THE FOCAL PLANE 
BAKEOUT ENABLED AND THE FOCAL PLANE TEMPERATURE ELEVATED TO -50~C.}
The DA heater is NOT turned on by this procedure.

\vspace{0.25in}
\noindent The sequence of actions will be: 
\be
\item enable FP bakeout and start heating FP to +20 C
\vspace{-0.10in}
\item monitor cold radiators' temperatures
\ee


%\vspace{0.25in}
\normalsize
\noindent {\bf ASSUMED INSTRUMENT STATE:} \\
\normalsize
Assumes the instrument is in the shuttle bay, DPA A and DEA A are on.\\

\vspace{0.25in}
\normalsize
\noindent {\bf SPECIAL INITIAL CONDITIONS:} \\
\normalsize
Assumes that only TLM FMT 6 is available.\\

%\newpage 

\vspace{0.25in}
\normalsize
\noindent {\bf OPERATIONAL CONSTRAINTS/CAUTIONS:} \\
\normalsize
The instrument is left in a state with the focal plane bakeout enabled
and the focal plane temperature elevated to +20~C.\\
{CARD ACIS-001} \\


\vspace{0.15in}
\normalsize
\noindent {\bf REFERENCES:} \\
\normalsize

\normalsize
\noindent {\bf CHANGE HISTORY:} \\
\normalsize

{\bf V1.0}
\begin{itemize}
\item Initial release
\end{itemize}

{\bf V1.1}
\begin{itemize}
\item Changed command in step 1.5 to ``WSFTPOS\_20''
\end{itemize}


\newcommand{\tablecaptiontext}{Partial Bakeout Procedure (Focal Plane Temperature to +20~C)}
\input{bakeout_bay.tab}

\end{document}
