Table 2: FOT Flight Procedure Release on March 19, 1999 # Title Filenames SOP name New PB NOT FLIGHT PROCEDURES Update Bad Pixel and Column List update bad MZ 61018 BAD PIXEL ppp.txt Killer Patch sw patch MZ 61003 FLT SWP ppp.txt Flight Software Standard Set of Patches (SCS) sw stdpatch MZ 61004 FLT SWSP ppp.txt Diagnostic Mode [realtime version] ccd diag posttv MZ 61001 DIAG RTL ppp.txt SHOULD BE A FLIGHT PROCEDURE 4.19 V1.1 Radiation Belt Entry radbelt entry MZ 61020 RAD BELT ENTRY ppp.txt 1.8 V1.1 Partial Bakeout, set FP to -50 C bakeout m50C MZ 61056 PBO NEG50 ppp.txt 1.11 V1.1 Flight Software Standard Set of Patches (realtime) sw stdpatch MZ 61027 FLT SWSP RTL ppp.txt Y 1.12 V1.1 Flight Software Event Histogram and CC 3x3 Patch sw optevhcc3x3 MZ 61007 SWP HIST 3x3 ppp.txt Y 1.15 V1.1 OBF Integrity Test ccd obf MZ 61053 OBF INTEGRITY ppp.txt Y 1.16 V1.1 Dark Current Measurement ccd dark MZ 61052 DARK CUR MEAS ppp.txt Y 1.18 V1.1 Internal Calibration Source Measurement at -90 C ccd int1 MZ 61051 INT CAL MEA 90 ppp.txt Y 1.19 V1.1 Internal Calibration Source Measurement at -110 C ccd int2 MZ 61050 INT CAL MEA 110 ppp.txt Y 2.2 V1.1 Exercise Focal Plane Heater Controls heater fp MZ 61048 EXER DH HEAT CTRL ppp.txt Y 2.7 V1.1 DEA Video Board DAC Limit Test dac limits MZ 61047 DACS LOW HIGH ppp.txt Y 2.8 V1.1 CCD Orbital Background Measurements ccd orbbkg1 MZ 61046 CHAR BKGRND CLOSE ppp.txt Y 2.11 V1.1 CCD Orbital Background Measurements II ccd orbbkg2 MZ 61045 CHAR BKGRND OPEN ppp.txt Y 2.12 V1.1 HRMA Flux Standard Transfer Sources Measurements ccd fcm MZ 61044 FLX XFR STD ppp.txt Y 4.2 V1.1 Turn on DPA A & B and DEA A [SCS version] turnon dpaab deaa scs MZ 61039 DPA ON SCS ppp.txt Y 4.3 V1.1 Turn on DPA A turnon dpaa MZ 61038 DPA A ON ppp.txt 4.4 V1.1 Turn on DPA B turnon dpab MZ 61037 DPA B ON ppp.txt 4.5 V1.1 Turn on DEA A turnon deaa MZ 61036 DEA A ON ppp.txt 4.6 V1.1 Turn off DPA A turnoff dpaa MZ 61035 DPA A OFF ppp.txt 4.7 V1.1 Turn off DPA B turnoff dpab MZ 61034 DPA B OFF ppp.txt 4.8 V1.1 Turn off DEA A turnoff deaa MZ 61033 DEA A OFF ppp.txt 4.15 V1.1 Set focal plane temperature to -50 C setFP m50 MZ 61059 FPTEMP NEG50 ppp.txt 4.17 V1.1 Warm Boot the ACIS BEP warmboot MZ 61070 WARM BOOT ppp.txt 4.18 V1.1 Cold Boot the ACIS BEP coldboot MZ 61071 COLD BOOT ppp.txt 5.1 V1.1 Close Little Vent Valve close lvv MZ 51000 CLOSE lvv ppp.txt 5.2 V1.1 Abort Opening Large Vent Valve abort opvv MZ 51001 ABORT OPEN LVV ppp.txt 5.3 V1.1 Close Large Vent Valve close vv MZ 51002 LRGVV CLOSE ppp.txt height 5.4 V1.1 Abort Closing Large Vent Valve abort clvv MZ 51003 ABORT CLOSING LVV ppp.txt 5.5 V1.1 Open Little Vent Valve in Emergency Deployment open lvv emgdep MZ 51004 OPEN LVV DEPLOY ppp.txt [SCS version] 5.6 V1.1 Turn Off DA heater side B and turn on side A dahtr aon boff MZ 51005 DAHTR B TO A ppp.txt 5.7 V1.1 Turn Off DA heater side A and turn on side B dahtr bon aoff MZ 51006 DAHTR A TO B ppp.txt 5.8 V1.1 Switch from BEP A to BEP B switch bepa b MZ 51007 BEP A TO B ppp.txt 5.9 V1.1 Switch from DEA A to DEA B switch deaa b MZ 51008 DEA A TO B ppp.txt Y