\documentclass[12pt]{article}

\usepackage{lscape}

\topmargin -1.0truein
\oddsidemargin -0.5truein
\textheight 9.75truein
\textwidth 7.0truein
\hbadness=10001
\hfuzz=200pt



\begin{document}


\begin{landscape}

\begin{table}[tbp]
\centering
\caption[ ]{\bf FOT Flight Procedure Release on March 10, 1999}

\begin{tabular}{|l|l|l|l|c|}
\hline
\#  & Title		& Filenames & SOP name & New PB \\
\hline
\hline
1.1\_1.0 & Open Little Vent Valve & open\_lvv & MZ\_61031\_LIT\_VV\_ppp.txt & 
\\
\hline
1.2\_V1.0 & Monitor Pressures and Temps & monitor\_tp & MZ\_61017\_MONITOR\_TEMP\_ppp.txt & \\
          & during Orbital Insertion & & &   \\
\hline
1.3\_V1.0 & Turn on DPA A \& B and DEA A & turnon\_dpaab\_deaa & MZ\_61002\_DPA\_ON\_ppp.txt &  \\
\hline
1.4\_V1.0 & Load DEA HK PB and  & deahkp  & MZ\_61010\_DEA\_HKP\_ppp.txt &  \\
          & Start DEA HK Run & & & \\
\hline
1.5\_V1.0 & Turn on the DA Heater Side B & dahtr\_b\_on & MZ\_61014\_FBO\_HTR\_ppp.txt &  \\
\hline
1.6\_V1.0 & Set FP Temperature to -120~C & setFP\_m120 & MZ\_61015\_FBO\_TMP\_ppp.txt &  \\
\hline
1.7\_V1.0 & Open Large Vent Valve & open\_vv & MZ\_61006\_LRG\_VV\_ppp.txt &  \\
\hline
1.9\_V1.0 & Set FP Temperature to -90 C & setFP\_m90  &
MZ\_61030\_FPTEMP\_NEG90\_ppp.txt &  \\
\hline
1.10\_V1.0 & Dump Flight SW & fs\_dump & MZ\_61055\_DUMP\_FSW\_ppp.txt & 
\\
\hline
1.13\_V1.0 & Diagnostic Mode & ccd\_diag & MZ\_61024\_DIAG\_MODE\_SCS\_ppp.txt & \\
\hline
1.14\_V1.0 & Raw Data from each CCD & ccd\_raw & MZ\_61054\_RAW\_DATA\_CCD\_ppp.txt & Y  \\
\hline
1.20\_V1.0 & Flight SW: Event Histogram patch & sw\_evhpatch &
MZ\_61058\_SWP\_EVH\_ppp.txt &  \\
\hline
1.21\_V1.0 & Evt Hist on the Int Cal Source  & ccd\_evhist\_s & MZ\_61012\_EVH\_CAL\_ACIS-S\_ppp.txt & Y  \\
           & with ACIS-S in fmt 1 & & &  \\
\hline
2.3\_V1.0 & SW Boot Modes: Uplink Boot & uplink\_boot &
MZ\_61022\_SW\_BOOT\_UPLINK\_ppp.txt &  \\
\hline
2.4\_V1.0 & SW Boot Modes: Warm and Cold & swbootmode & MZ\_61023\_SW\_BOOT\_WC\_ppp.txt & \\
\hline
2.5\_V1.0 & BEP/DEA Power Combinations & power\_combo & MZ\_61019\_POWER\_COMBO\_ppp.txt & \\
\hline
2.6\_V1.0 & DEA/FEP MUX Verification & deafep\_mux &  MZ\_61008\_DEA\_FEP\_MUX\_ppp.txt &  \\
\hline
2.9\_V1.0 & Full Bakeout & full\_bakeout\_cold &  MZ\_61005\_FULL\_BO\_ppp.txt & \\
\hline
4.9\_V1.0 & Turn Off DPA A \& B and DEA A & turnoff\_dpaab\_deaa  & MZ\_61011\_DPA\_OFF\_ppp.txt &  \\
\hline
4.10\_V1.0 & Put ACIS into Memory Save Mode & mem\_save &
MZ\_61016\_MEMORY\_SAVE\_ppp.txt &  \\
\hline
4.11\_V1.0 & Put ACIS into Standby Mode   & standby &
MZ\_61021\_STANDBY\_MODE\_ppp.txt &  \\
\hline
\end{tabular}

\end{table}

\end{landscape}

\end{document}

